<template>
	<view class="page-body">
		<page-header :name="pageData.name" :bg="'#1560e0'" :showLeft="true" @goBack="goBack()"></page-header>
		<view class="scroll-wrap">
			<view class="basic-info-wrap">
				<view class="img-wrap">
					<image src="@/static/rhb.jpg" />
				</view>
				<view class="radius-wrap"></view>
			</view>
			<view class="detail-info-wrap">
				<page-card style="margin-bottom: 30rpx;" :notShow="true" :name="'设备参数'">
					<template v-slot:content>
						<simple-table :tableHead="tableHead" :list="paramsList"></simple-table>
					</template>
				</page-card>
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				pageData: {},
				tableHead: ['名称', '参数'],
				paramsList: [{
					name: 'PID自动调节设定值',
					params: ['0.02MPa']
				},{
					name: '2#补水流量',
					params: ['203.01m³/h']
				},{
					name: '锅筒水位',
					params: ['0.02MM']
				},{
					name: '锅筒压力',
					params: ['0.02MM']
				},{
					name: '排烟温度',
					params: ['0.02℃']
				},{
					name: '燃烧器负荷',
					params: ['0.02%']
				},{
					name: '起停炉设定值',
					params: ['0.02MPa']
				},{
					name: '主蒸汽压力',
					params: ['0.02MPa']
				},{
					name: '主蒸汽温度',
					params: ['0.02℃']
				},{
					name: '2#蒸汽电动闸',
					params: ['0.02%']
				},{
					name: '水箱液位',
					params: ['0.02m']
				},{
					name: '3#补水泵运行频率',
					params: ['0.02Hz']
				}]
			}
		},
		onLoad(option) {
			this.pageData = JSON.parse(option.data)
		},
		methods: {
			goBack() { // 返回上一頁面
				uni.navigateBack()
			}
		}
	}
</script>

<style scoped lang="scss">
	.page-body {
		.scroll-wrap {
			height: calc(100vh - 85rpx);
			overflow: scroll;

			.basic-info-wrap {
				position: relative;
				height: auto;
				padding: 0rpx 49rpx 0;
				background: url(../../../static/page_bg.png);
				background-size: 140%;

				.info-wrap {
					display: flex;
					flex-wrap: wrap;

					.data-item-wrap {
						width: 33.33%;
						padding: 9rpx 0;
						min-height: 81rpx;
						text-align: center;
						margin-top: 48rpx;
						border-right: 1px solid #FFFFFF;

						.title {
							font-size: 22rpx;
							color: #FFFFFF;
							margin-bottom: 14rpx;
						}

						.data {
							font-weight: 700;
							font-size: 32rpx;
							color: #FFF600;
						}
					}

					.data-item-wrap:nth-child(-n+3) {
						margin-top: 0;
					}

					.data-item-wrap:nth-child(3n) {
						border: none;
					}
				}

				.img-wrap {
					padding: 38rpx 0 57rpx;
					text-align: center;

					image {
						width: 100rpx;
						height: 120rpx;
					}
				}

				.radius-wrap {
					position: absolute;
					left: 0;
					bottom: 0;
					width: 100vw;
					height: 30rpx;
					background-color: #fff;
					border-radius: 35rpx 35rpx 0 0;
				}
			}
			
			.detail-info-wrap {
				padding: 40rpx 35rpx;
				
				.detail-wrap {
					display: flex;
					flex-wrap: wrap;
					padding: 35rpx 55rpx 18rpx 55rpx;
					color: #8D8D8D;
					.item {
						display: flex;
						font-size: 26rpx;
						justify-content: space-between;
						width: calc(50% - 61rpx);
						margin-bottom: 50rpx;
						
						.params {
							color: #00BD00;
						}
						
						.status-wrap {
							width: 100%;
							
							/deep/ .tip-wrap {
								width: 100%;
								justify-content: space-between;
							}
						}
					}
					
					.item:nth-child(2n) {
						margin-left: 120rpx;
					}
				}
				
				.params-wrap {
					display: flex;
					flex-wrap: wrap;
					font-size: 26rpx;
					padding: 35rpx 55rpx;
					
					.item {
						width: calc(50% - 32rpx);
						display: flex;
						justify-content: space-between;
						margin-top: 50rpx;
						
						view:first-child {
							color: #8D8D8D;
						}
					}
					
					.item:nth-child(2n) {
						margin-left: 62rpx;
					}
					
					.item:nth-child(-n+2) {
						margin-top: 0;
					}
				}
			}
		}
	}
</style>