<template>
	<view class="content">
		<view class="item_box" style="background-color: #009FE8;">
			<view class="img">
				<image src="../t-p-icon/icon_1.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">绩效排名</view>
				<view class="tip">绩效考核分数统计</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #638BD5;" @click="go_production_statistics()">
			<view class="img">
				<image src="../t-p-icon/icon_2.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">生产报表</view>
				<view class="tip">当日产量140517.8吨</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #A3A2E4;" @click="go_personnel_orientation()">
			<view class="img">
				<image src="../t-p-icon/icon_3.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">人员定位</view>
				<view class="tip">井下人数3892人</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #8BC8DA;" @click="go_safety_monitoring()">
			<view class="img">
				<image src="../t-p-icon/icon_4.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">安全监测</view>
				<view class="tip">6268监测点</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #9AE2A2;" @click="go_zdhxt('tfgl')">
			<view class="img">
				<image src="../t-p-icon/icon_5.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">通风管理</view>
				<view class="tip">共40个通风机</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #FBB47B;" @click="go_video_monitor()">
			<view class="img">
				<image src="../t-p-icon/icon_6.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">视频监控</view>
				<view class="tip">工业视频</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #FA8B89;" @click="go_risk_precontr0l()">
			<view class="img">
				<image src="../t-p-icon/icon_7.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">风险预控</view>
				<view class="tip">分数统计</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #2C3E50;" @click="go_zdhxt('zys')">
			<view class="img">
				<image src="../t-p-icon/icon_8.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">主运输</view>
				<view class="tip">主运输皮带</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #2873FF;" @click="go_zdhxt('psxt')">
			<view class="img">
				<image src="../t-p-icon/icon_9.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">排水系统</view>
				<view class="tip">中央水泵</view>
			</view>
		</view>
		<view class="item_box" style="background-color: #8BC8DA;" @click="go_zdhxt('yfzd')">
			<view class="img">
				<image src="../t-p-icon/icon_10.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">压风制氮</view>
				<view class="tip">压风制氮系统 </view>
			</view>
		</view>
		<view class="item_box" style="background-color: #A3A2E4;">
			<view class="img">
				<image src="../t-p-icon/icon_11.png" mode=""></image>
			</view>
			<view class="text">
				<view class="name">设备监测</view>
				<view class="tip">容知设备监控</view>
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		name: "t-p-n-section-1",
		data() {
			return {
				mine_code: ""
			};
		},
		methods: {
			// 自动化统计列表
			go_zdhxt(zdhxt) {
				uni.navigateTo({
					url: "../../production/zidonghua/zidonghua?url=" +
						"http://webdevelop.nxjiewei.com/assets/html/E-zidonghua/?zdhxt=" + zdhxt
				})
			},
			// 生产统计
			go_production_statistics() {
				uni.navigateTo({
					url: "../../ningdongyunying/production_statistics/production_statistics"
				})
			},
			// 人员定位
			go_personnel_orientation() {
				uni.navigateTo({
					url: "../../ningdongyunying/personnel_orientation/personnel_orientation"
				})
			},
			// 安全监测
			go_safety_monitoring() {
				uni.navigateTo({
					url: "../../ningdongyunying/safety_monitoring/safety_monitoring"
				})
			},
			// 风险预控
			go_risk_precontr0l() {
				uni.navigateTo({
					url: "../../ningdongyunying/risk_precontrol/risk_precontrol"
				})
			},
			// 视频监控
			go_video_monitor() {
				uni.navigateTo({
					url: "../../production/video_monitor/video_monitor?mine_code=" + this.mine_code
				})
			},
		}
	}
</script>

<style lang="scss">
	.content {
		box-sizing: border-box;
		padding: 20rpx 25rpx 0;
		margin-bottom: 100rpx;

		overflow: hidden;


		.item_box {
			float: left;

			width: 220rpx;
			height: 280rpx;

			margin-right: 20rpx;
			margin-bottom: 20rpx;
			border-radius: 16rpx;

			.img {
				box-sizing: border-box;
				padding-top: 40rpx;
				text-align: center;

				image {
					width: 140rpx;
					height: 140rpx;
				}
			}

			.text {
				text-align: center;
				color: #FFFFFF;
				line-height: 40rpx;

				.name {
					font-size: 28rpx;
				}

				.tip {
					font-size: 24rpx;
					white-space: nowrap;
					overflow: hidden;
					text-overflow: ellipsis;
				}
			}
		}

		.item_box:nth-child(3n) {
			margin-right: 0;
		}

	}
</style>
